(a) (b)

(c) (d)

(e) Figure 3: Example of the types of comparisons which should be done to verify the results.

First, compare the original topography (a) with the final conditioned topography (b). Second compare the original slope factor (c) with the final slope factor (d). Third look at the sizes and locations of the changes to the topography (e).